Title: Site testing
Course: LoadTesting

Write your own strlen function, called mystrlen, which behaves exactly like the standard strlen, except that a string can be terminated by either a null byte (0) or an exclamation mark character (!).

Write a function with signature int sqr(int n) that returns the square of its parameter n.

Write a function that breaks the system.